-- MSIN-4512 — Message « plus de place » quand budget colonnes atteint
-- Contexte : suite mockup A dist-print (feedback au clic chip refusée)
-- Notes : exécution UNIQUEMENT sur dev préprod ; autres env = Navicat structure + sync_static_db

INSERT INTO info (info_clef, info_langue, info_texte, info_aide, info_prg, info_description, info_trie, info_actif, info_option1, info_option2, info_option3, info_creation)
SELECT 'bib_v4_dist_print_fit_full', 'fr', 'Plus de place pour cette orientation — retirez une colonne ou passez en paysage.', '', 'compte.php', '', 0, 1, '', '', '', NOW()
FROM DUAL WHERE NOT EXISTS (SELECT 1 FROM info WHERE info_clef = 'bib_v4_dist_print_fit_full' AND info_langue = 'fr' AND info_prg = 'compte.php');

INSERT INTO info (info_clef, info_langue, info_texte, info_aide, info_prg, info_description, info_trie, info_actif, info_option1, info_option2, info_option3, info_creation)
SELECT 'bib_v4_dist_print_fit_full', 'en', 'No room left for this orientation — remove a column or switch to landscape.', '', 'compte.php', '', 0, 1, '', '', '', NOW()
FROM DUAL WHERE NOT EXISTS (SELECT 1 FROM info WHERE info_clef = 'bib_v4_dist_print_fit_full' AND info_langue = 'en' AND info_prg = 'compte.php');
